         180           8
   7.71766382653121        6.93616785209577        6.18450265661203     
   5.41793214938743        4.69197912549033        3.90524853329995     
   3.10796184254851        2.29812187386357     
   3.33960448415945        2.61749178516641        2.20211801492801     
   2.10389382669231        2.09297547255306        2.09277017702252     
   2.02607590652192        2.10772188195025     
 -1.175387950250042E-002  0.000000000000000E+000
   1.00958007164595       0.000000000000000E+000
   1.01332581104902       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
