         180           8
  -3.62962700318590       -4.14696164335938       -4.58080697125736     
  -5.02978379121562       -5.50984529527846       -5.95779983054258     
  -6.38054841561193       -6.79940652542843     
   4.76149544207805        4.71083627673886        4.67290075053348     
   4.62536420867002        4.59393964866527        4.51821171113941     
   4.44815750020352        4.43433908411569     
 -1.210809701059150E-002  0.000000000000000E+000
   1.00889136642828       0.000000000000000E+000
   1.01344270930509       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
