         180           8
   7.69722838275054        7.07877615125003        6.47838259535362     
   5.83962902401168        5.22929321900178        4.72382763141698     
   4.26297762485736        3.81803942521516     
   6.93185004540129        7.12100805047424        7.10396002161962     
   7.13928302699152        7.13307142938511        7.12495940000065     
   7.08677135632175        7.09485131955329     
 -1.696909659635031E-003  0.000000000000000E+000
  0.986661452202449       0.000000000000000E+000
  0.984330163487989       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
