         180           8
   1.09408446921924       0.540148817358288      -5.529370406105512E-002
 -0.608291538432747       -1.11373347810555       -1.64403284492470     
  -2.01295482999821       -2.23699699878872     
   3.02770677493652        3.06161372230316        3.17147504698820     
   3.30309716673860        3.50737486934598        3.80058125246200     
   4.05274414044514        4.48342129429930     
 -1.589649835050375E-003  0.000000000000000E+000
  0.986680223856432       0.000000000000000E+000
  0.984403359959310       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
