         180           8
  -1.57730848834213       -1.98940042992044       -2.38851855743712     
  -2.78316868730136       -3.17244776213076       -3.55888200030169     
  -3.91474630211174       -4.21962481029614     
   1.86830388772526        1.71376620827832        1.61409147954215     
   1.55519952378465        1.48471758589177        1.48941779727658     
   1.58948073817912        1.73335347888015     
 -1.171094725840138E-002  0.000000000000000E+000
   1.00896909298035       0.000000000000000E+000
   1.01297789269081       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
