         180           8
 -0.579366963736098       -1.16904369251687       -1.64908042839253     
  -1.97549391407337       -2.19929293317168       -2.38471329647619     
  -2.51856381621003       -2.61041112114881     
   2.16989342284037        2.28415085128789        2.31788976343241     
   2.40885342893775        2.44003612481751        2.38500209378758     
   2.60251432141635        2.46350203451752     
 -1.410701118840265E-003  0.000000000000000E+000
  0.986697000599336       0.000000000000000E+000
  0.984391122242830       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
