         180           8
 -0.762607164659691       -1.23768012141983       -1.67052399479006     
  -2.06262986372239       -2.45306340425192       -2.77007556352015     
  -3.01784138206491       -3.19245421101262     
  0.640130858161797       0.584345033342804       0.470045511638260     
  0.457910240344043       0.384820990200127       0.212665726597109     
  0.276580336559816       0.511805263570102     
 -1.173653299855509E-002  0.000000000000000E+000
   1.00903606880172       0.000000000000000E+000
   1.01351063830832       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
