         180           8
 -0.440892145232015      -0.730949768126136      -0.905723120839583     
  -1.08593582199677       -1.23295200668687       -1.40035781766325     
  -1.52696624121212       -1.57101129182746     
  -1.60645860126594       -1.49672265544999       -1.37031301554254     
  -1.17892198341286      -0.961925524741313      -0.758701222096808     
 -0.540885760682986      -0.316578991183373     
 -1.225189813466303E-002  0.000000000000000E+000
   1.01007353128248       0.000000000000000E+000
   1.01394315823723       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
