         180           8
  -1.95961262592700       -2.55271365862760       -3.19883407292290     
  -3.80694378445074       -4.39214246203613       -4.97867459152674     
  -5.44285363856736       -5.84002435913219     
   2.52676129780691        3.14581602626424        3.78110191139394     
   4.42629524048684        5.13190882677825        5.83509156984221     
   6.54912706932143        7.30731149914338     
 -1.520442668341532E-003  0.000000000000000E+000
  0.987247956935958       0.000000000000000E+000
  0.984712241807207       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
