         180           8
  -2.28169250854616       -2.69405360084635       -3.11539926823227     
  -3.50764646454894       -3.89773740857153       -4.30829237495365     
  -4.64162997207626       -4.92674943001593     
 -0.187078877968847       0.177735840848290       0.567408697234578     
  0.948733006433827        1.36658986424640        1.80139311444609     
   2.21601794125019        2.71800134616635     
 -1.214931454720070E-002  0.000000000000000E+000
   1.00996395984300       0.000000000000000E+000
   1.01398262476700       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
