         180           8
  -2.57669832081302       -3.18794945870143       -3.62299796752272     
  -3.85423192103446       -4.09140704087618       -4.40744968930846     
  -4.61691929664657       -4.79997382019380     
   1.35691028654997        1.39876665773154        1.47561031791354     
   1.59855705602602        1.78755717515120        1.90330082172746     
   2.37234092320574        3.17881256412460     
 -1.566118706382147E-003  0.000000000000000E+000
  0.987313246753698       0.000000000000000E+000
  0.984759201974311       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
