         180           8
  -4.44924447364733       -4.81321130953574       -5.13867903893102     
  -5.33655436490976       -5.53547066158348       -5.75429635035734     
  -5.87187407938413       -5.98544218344042     
  -1.72655436223967       -1.93126012409132       -2.14401738079513     
  -2.28872190473999       -2.35650370849250       -2.54093326962193     
  -2.33334839788513       -1.64905763989698     
 -1.221423912811405E-002  0.000000000000000E+000
   1.00965141456375       0.000000000000000E+000
   1.01379911923783       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
