         180           3
  -14.0178919172230       -16.0890005748495       -18.4100997827901     
   26.6434318761361        25.9004500449472        26.0279142447527     
  3.360007462538982E-004  0.000000000000000E+000
  0.986023016783976       0.000000000000000E+000
  0.983251556446852       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
