         180           3
  -14.1370018926885       -16.2147241294013       -18.5442031857598     
   26.6418013756945        25.8360876812642        25.7603075033174     
  2.043759315326376E-004  0.000000000000000E+000
  0.985967020355659       0.000000000000000E+000
  0.983300071329360       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
