         180           3
  -21.5697791154297       -23.3384698982989       -24.7185540351592     
   23.3488029481298        23.8712142025345        25.1051551479115     
  1.853358049823475E-004  0.000000000000000E+000
  0.986022663579922       0.000000000000000E+000
  0.983581527785998       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
