         180           3
  -22.4696117375004       -24.0034374522526       -25.0858466215730     
   24.1044211789636        24.0208038777690        24.5975997617480     
  1.200050820402589E-004  0.000000000000000E+000
  0.986044437163956       0.000000000000000E+000
  0.983554570115252       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
