         180           3
  -22.4531676699492       -20.4678286057032       -18.5012475684646     
   24.8012408877138        25.4787091634513        26.9793679823173     
 -1.020547900496099E-004  0.000000000000000E+000
  0.986357837467109       0.000000000000000E+000
  0.983591767609623       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
