         180           8
   3.08761533606392        2.84942901919780        2.76169895324153     
   2.67866937368020        2.59194232069203        2.54815056917119     
   2.56814502932595        2.57016360345023     
   4.80695218309512        5.03822168227208        5.32441695242286     
   5.73501527435936        6.17058916687052        6.59766431642606     
   6.99783990666338        7.51033701595970     
 -2.793319405413399E-002  0.000000000000000E+000
   1.00875521949953       0.000000000000000E+000
   1.01542675331597       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
