         180           3
  -17.5652420810086       -19.6943842843657       -22.0944162151171     
   6.19094026407018        6.06494030365722        5.81122178063111     
  4.838699049338867E-003  0.000000000000000E+000
  0.988491190586673       0.000000000000000E+000
  0.985604692996268       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
