         180           3
  -17.6264188842512       -19.7951560134716       -22.1078936526515     
   6.88802755489874        6.11016013221486        6.06803755795089     
  4.782400746577328E-003  0.000000000000000E+000
  0.988357337510461       0.000000000000000E+000
  0.985708765926464       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
