         180           8
   6.39982399235530        5.85977717066810        5.46164286635551     
   5.04867363201992        4.66205648726041        4.35656294191736     
   4.06567684498855        3.89048197122622     
  -11.0940779109215       -10.1909415374696       -9.55893813358428     
  -8.80063239431026       -7.92365981803689       -7.06140301074522     
  -6.19228757695092       -5.40188985098054     
 -2.349146663720345E-002  0.000000000000000E+000
   1.01158084091424       0.000000000000000E+000
   1.01714225032430       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
