         180           3
  -26.7947064609628       -25.2244151175324       -23.7419553197614     
   6.02498003490274        8.19725911769558        10.9556938307823     
  5.098011388944816E-003  0.000000000000000E+000
  0.988305332076391       0.000000000000000E+000
  0.985760979945075       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
