         180           8
   4.81047677619662        4.58377003612167        4.39054820756759     
   4.13591903962364        3.90529842243528        3.70770552018840     
   3.52953817747538        3.38199135390991     
  -8.05463873713186       -7.53104958511494       -6.85337708532880     
  -6.13054050018780       -5.35293301123204       -4.52971001479786     
  -3.74719924754882       -2.94012975119983     
 -2.358971979186197E-002  0.000000000000000E+000
   1.01183161737611       0.000000000000000E+000
   1.01732047903194       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
