         180           3
  -25.9848791513666       -24.5283139278812       -23.1991284029123     
 -0.437219465104695        2.76150784167166        5.67618465230280     
  4.994144926087176E-003  0.000000000000000E+000
  0.988255338773297       0.000000000000000E+000
  0.985681666680876       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
