         180           8
   5.55434651916113        5.41686173901069        5.14808939467824     
   4.87772218590085        4.61836891285080        4.36160965481658     
   4.15233199974478        3.97203519801291     
  -14.2600128107078       -13.4587967439583       -12.4487789967547     
  -11.5086227245142       -10.5750166236383       -9.64058150134918     
  -8.77299349283368       -7.90801248897090     
 -2.366528938201371E-002  0.000000000000000E+000
   1.01157081253197       0.000000000000000E+000
   1.01738453536062       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
