         180           8
   6.16746223923872        5.97299594036328        5.85179713269811     
   5.73824658170332        5.65003574822932        5.63435521013568     
   5.65576431282506        5.66970909613577     
  -17.4143508541476       -17.3694320861511       -17.1338892498111     
  -16.8205912101819       -16.4509291488920       -16.0677468984745     
  -15.6391228999800       -15.1663213113692     
 -2.342261397313994E-002  0.000000000000000E+000
   1.01132054143769       0.000000000000000E+000
   1.01663906795039       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
