         180           8
   5.79257174947487        5.62302612051771        5.47371735687579     
   5.37649224488382        5.28121546042418        5.21812541885462     
   5.24312946340183        5.19776681375193     
  -17.4801456847041       -17.2830888195231       -17.1044848566947     
  -16.8747572634219       -16.4948430327870       -16.1313189612380     
  -15.7828098455498       -15.3335073610406     
 -2.354639983164630E-002  0.000000000000000E+000
   1.01126648159675       0.000000000000000E+000
   1.01681530506591       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
