         180           8
   5.60988363028379        5.40229325094802        5.14789527483272     
   4.99658751292911        5.03008999050599        5.10595007210224     
   5.09387815676143        5.14845762968938     
  -19.0574492204000       -19.4096394540613       -19.7624154553903     
  -20.2238950087700       -20.9899452914519       -21.8170052962773     
  -22.2956268143029       -22.5553555946337     
 -2.345557290347449E-002  0.000000000000000E+000
   1.01064876368667       0.000000000000000E+000
   1.01660244681467       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
