         180           8
   5.16204099968409        4.90129065032386        4.66448989007142     
   4.55680763181547        4.62934830979911        4.70117799899180     
   4.73701670086241        4.66522987051044     
  -18.9261420277199       -19.3369515299790       -19.7151969942034     
  -20.2108083676002       -20.9504929211611       -21.7520672919084     
  -22.2341998907733       -22.5417520199639     
 -2.349731929850978E-002  0.000000000000000E+000
   1.01092828552118       0.000000000000000E+000
   1.01685490442985       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
