         180           8
   5.61465287199841        5.29035960841279        5.02285947639864     
   4.87469638245544        4.94411036958405        5.00994958156472     
   5.00512249190890        4.96694631797531     
  -17.6179549711981       -18.3713318698289       -18.9632996268006     
  -19.6885527590969       -20.6619614279849       -21.6542649060479     
  -22.2717488593529       -22.6910828335110     
 -2.352187501420525E-002  0.000000000000000E+000
   1.01098380622475       0.000000000000000E+000
   1.01714178744304       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
