         180           8
   3.43697481462728        3.29792547505267        3.32294878583101     
   3.50558030517644        3.56228018740580        3.42296158521630     
   3.42571298002579        3.40485160586972     
  -18.3419608778285       -18.6336972810850       -19.1872137706630     
  -19.8443282948198       -20.3746599955484       -20.7390000132675     
  -21.0005260683883       -21.2645138976842     
 -2.371494731831898E-002  0.000000000000000E+000
   1.01151673293639       0.000000000000000E+000
   1.01715009057728       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
