         180           8
   5.60325210576558        5.39081001886318        5.16241111489650     
   5.02885065254884        5.11471503142039        5.21128089093846     
   5.22353456639944        5.14329113238519     
  -18.3886953168129       -18.8264607253233       -19.2779150667567     
  -19.8147679429712       -20.5724658620728       -21.4210805915839     
  -21.8950597555293       -22.2203078203694     
 -2.340916330930334E-002  0.000000000000000E+000
   1.01105536239077       0.000000000000000E+000
   1.01722174134222       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
