         180           3
  -24.2655961167085       -26.1194359426479       -27.5462109731875     
  -4.86334903726273       -4.84211620524057       -4.20292246041508     
  4.937752097647850E-003  0.000000000000000E+000
  0.988158330711427       0.000000000000000E+000
  0.985570921370130       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
