         180           8
   6.52045819709722        6.18517818996836        5.92023810989268     
   5.81355606230737        5.87979590392196        5.89594205350577     
   5.88232168851801        5.94512003905830     
  -18.6953277437864       -19.1444583506817       -19.5367481932015     
  -20.0399323311089       -20.7664924166596       -21.5347309427922     
  -22.0442290573261       -22.2656906860946     
 -2.342051512241888E-002  0.000000000000000E+000
   1.01117339372763       0.000000000000000E+000
   1.01705460972124       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
