         180           8
   6.87049908053153        6.44806148262036        6.18610083217456     
   6.00467849977846        6.06378338965712        6.14493051598853     
   6.04367911856425        6.01964795948019     
  -18.4085359144931       -19.2507475332357       -19.6350344228180     
  -19.9143919721279       -20.9331951053170       -21.9191222422320     
  -22.5560823707910       -22.6897431937193     
 -2.349079775720297E-002  0.000000000000000E+000
   1.01095818576011       0.000000000000000E+000
   1.01705100980978       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
