         180           8
   3.13821735216282        3.09456516299813        3.10097859984014     
   3.07761174609609        3.00576613066566        2.85624468031705     
   2.84095012909090        2.78207156010826     
  -17.7389395877842       -18.0579094385478       -18.4446570719336     
  -18.6846906218072       -18.9501098750377       -19.1885486736024     
  -19.3115706069407       -19.3320107918249     
 -2.389481043957628E-002  0.000000000000000E+000
   1.01094032018836       0.000000000000000E+000
   1.01762991668724       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
