         180           3
  -16.5209994459828       -18.2208469474230       -19.9954867460642     
  0.584501597412840      -0.746230637165003      -0.875097620732196     
  5.263047453632599E-003  0.000000000000000E+000
  0.988337406998728       0.000000000000000E+000
  0.985456973490929       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
