         180           8
   11.9651337930085        11.2895876444892        10.7176243633824     
   10.1104471201531        9.49351381558903        8.89066435376929     
   8.36359606567233        7.89789967804469     
  -13.0791406344888       -13.1413479170739       -13.3490138007012     
  -13.6317760148411       -13.9575402938244       -14.2265144678726     
  -14.3272769697923       -14.5088683691642     
 -2.334544328944224E-002  0.000000000000000E+000
   1.01184959398112       0.000000000000000E+000
   1.01793483900146       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
