         180           8
  -16.5174733147798       -17.0173306518243       -17.4690452495515     
  -17.9505452257069       -18.4791070758167       -18.9895917189597     
  -19.4852813846102       -19.9468472209199     
  0.361774669919166       0.140588978737633      -0.233268680031653     
 -0.609680263477378      -0.897805308057557       -1.03616014772440     
 -0.922335266081628      -0.929360145718411     
  5.264363860188951E-003  0.000000000000000E+000
  0.988362278734938       0.000000000000000E+000
  0.985465023142058       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
