         180           3
  -16.6140139335399       -18.2103172421155       -19.9237401144220     
  -1.16128542224402       -1.59100137959384       -1.80111747758530     
  5.280181325792063E-003  0.000000000000000E+000
  0.987993277321848       0.000000000000000E+000
  0.985570910665787       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
