         180           8
   12.2916369983384        11.6671558693652        11.0638278311744     
   10.4795684787020        9.87691581887617        9.27844940281137     
   8.76421801187895        8.27916189384311     
  -13.5120006835389       -13.8121762569671       -13.8360142307371     
  -13.8625069774331       -14.0388287780591       -14.2760034091050     
  -14.5112783216915       -14.6097990517860     
 -2.335788351480872E-002  0.000000000000000E+000
   1.01169087898449       0.000000000000000E+000
   1.01722600809039       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
