         180           8
   12.3721989861253        11.6382795115970        11.0806053931193     
   10.4556786602561        9.82788064826436        9.26410611207961     
   8.74094789001007        8.20576555171862     
  -13.8923366866315       -13.7879955749271       -13.9933005012177     
  -14.1043534321322       -14.2424205786270       -14.3861571042533     
  -14.5839498873647       -14.7894081044435     
 -2.340068356331980E-002  0.000000000000000E+000
   1.01155899250164       0.000000000000000E+000
   1.01717178308074       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
