         180           8
   6.84544599059483        6.56285626950433        6.57637642591708     
   6.59120961124471        6.44119712976423        6.35759814907001     
   6.24749160393623        6.15302516269221     
  -9.46166373152755       -9.48350795720427       -9.09825907786974     
  -8.72390188046675       -8.26498152603466       -7.87247653760919     
  -7.52885061119338       -7.33757478108785     
 -2.196713926712686E-002  0.000000000000000E+000
   1.00862270052862       0.000000000000000E+000
   1.01494936139264       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
