         180           3
  -22.5106232394326       -21.1898384829261       -19.8173807117629     
   18.7133028566849        20.9717251885578        23.5895096120264     
  5.187070557998842E-003  0.000000000000000E+000
  0.986898526085169       0.000000000000000E+000
  0.983826527389557       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
