         180           8
   5.05913336209358        4.75970610006987        4.62612978349330     
   4.55293883853534        4.40887433519543        4.20522418441622     
   4.01547612881341        3.79931031655712     
  0.810263232525791       0.945089101706378        1.39812408679943     
   2.14633652934968        2.93876396042630        3.73674722615132     
   4.40727240905019        4.77237622127356     
 -2.191290029910064E-002  0.000000000000000E+000
   1.00855229902887       0.000000000000000E+000
   1.01514486297684       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
