         180           3
  -22.6541386861678       -21.0634465715787       -20.0819822161782     
   15.4583259226056        17.1427212332567        20.5018415265312     
  5.235491337948624E-003  0.000000000000000E+000
  0.986923185307022       0.000000000000000E+000
  0.983930595201087       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
