         180           3
  -22.0720423161016       -20.1202322025205       -20.2635223896652     
   11.9732751543077        13.8640515688609        19.2614845540553     
  4.978938862959113E-003  0.000000000000000E+000
  0.986630945673427       0.000000000000000E+000
  0.983860786954860       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
