         180           8
   6.25858565547903        6.03126250252769        6.01079323660763     
   5.95211986792356        6.01566877396767        5.60027719551484     
   4.43310099045858        4.16331922253236     
  -9.79195978549776       -9.35517833149142       -8.89263504480778     
  -8.62036783233697       -8.33273225659574       -7.19133949722818     
  -5.06832994859235       -3.56133682210342     
 -2.203646345490445E-002  0.000000000000000E+000
   1.00893543983570       0.000000000000000E+000
   1.01506222239868       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
