         180           8
   6.10649312575998        6.06418317424294        5.96141637987187     
   5.80355840210315        5.62722956625869        5.55103628636284     
   5.60243329152416        5.50694948772826     
  -9.78025395116505       -9.48389848541582       -9.16270203616921     
  -8.83069573320820       -8.56866789056201       -8.22547042133710     
  -7.77009728319693       -7.42361596276242     
 -2.206141410590453E-002  0.000000000000000E+000
   1.00892946602634       0.000000000000000E+000
   1.01486105166349       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
