         180           8
   5.36937365833359        5.25688318312641        5.12306902871264     
   5.09322137794688        5.13256346086647        5.15828465578537     
   5.24315337403080        5.33972231186134     
  -9.79112109178315       -10.0327247129705       -10.2125688048551     
  -10.5038118367665       -11.3432656103071       -12.0576209341248     
  -12.2500137536799       -12.3799564129089     
 -2.194397207485944E-002  0.000000000000000E+000
   1.00882715972895       0.000000000000000E+000
   1.01452052290513       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
